Intro

IntroductiontoAHSdrivermanualpages

Description

This section contains HW-style manual pages for some drivers that are distributed through the AHS program or mechanisms other than the main SCO OpenServer releases. It also contains some man pages for mass storage devices that were not documented in the SCO OpenServer documentation (although they were distributed with the software).

Section AHS manual pages are incorporated with the appropriate driver SSO and linked into the section when the driver is installed.

Much of the information in these pages was provided by the companies who provided the driver software. Consequently, you will notice some variation in style and quality of the information.

See also

Intro(HW)

Intro(AHS)

15 April 1996 1

- -